INSERT INTO result VALUES
(1, 90672.484375, 1.1339103227112086e22),
(2, -3.9885693578263373e-16, 7.833575980360231e-174),
(3, 7.240773990175674e22, 1.4197898344540396e280),
(4, 59127382016.0, 6.616223591746987e-236),
(5, -4.2604917653137e17, 4.362379751853048e133),
(6, -271989.78125, 3.251462614608522e-186),
(7, -2234509426688.0, 2.724018576451632e-22),
(8, 4.575370547937472e29, 3.748573372495495e154),
(9, -0.0014323251089081168, 5.4988323481225707e45),
(10, -3.28562618062905e-23, 2.206077893973367e-168),
(11, -13047437459456.0, 4.166804169107403e-100),
(12, 2.5795822958546562e36, 1.632393225116654e-87),
(13, 5.483646869919312e-9, 21249691.171849478),
(14, -3.853022526155832e-35, 5.947947743978342e-182),
(15, 3.1382959907484334e31, -7.795565200938266e130),
(16, -1.0497456421507568e-27, -1.0592991141145154e17),
(17, 1.5472405742531271e38, -3.1290732865309286e174),
(18, 184289.1875, -3.896294566591252e-73),
(19, -9.706033661098786e36, -5.763447382303127e147),
(20, -1.3068177182745666e-12, -1.5322762544893857e184),
(21, 20397.857421875, 8.851270437374964e-244),
(22, -8.264244104892828e-24, -4.628369298342482e282),
(23, -0.0017546163871884346, 714606769936.4602),
(24, -4.840370326775201e-9, -5.433999502097366e211),
(25, -9.99207236423123e17, -2.310721571800414e-258),
(26, 3.712962536102852e29, 4.136223942330634e-183),
(27, -1.2318039616064832e24, 1.324698983551158e-265),
(28, -0.0039032120257616043, 1.148385179919965e164),
(29, -11832683134976.0, 1.0086204532409517e-46),
(30, 1.839200552239864e23, -1.8628866409044736e17),
(31, -3.7525185490257055e-19, 1.4242891264403062e-136),
(32, -2.478781159400999e-31, -6.393287095280547e-9),
(33, -118.38725280761719, 8039257107.044941),
(34, 2.9621754525204186e-37, 8.568219555719027e-28),
(35, -6.4958161666976e25, 4.696497143717539e-150),
(36, -3.534039077491801e-27, 2.828365085092237e-63),
(37, 0.46201908588409424, 2.4086920863229868e221),
(38, -1730867200.0, 1.7040597490515657e169),
(39, -2.3207548497923827e20, 3.195767411252744e189),
(40, 8.96008259527905e-22, -7.261114640705759e-237),
(41, 9.793616827353538e-19, 2.611466464958359e-238),
(42, 7.116422136891493e-34, -1.248617608609914e-101),
(43, -32209061888.0, -9.517551565433224e-94),
(44, 2.890690087110959e-21, 2.5302639567197774e179),
(45, -7.360597908956379e-9, 1.2453982176648428e186),
(46, 4.07431450307689e-16, 2.0173561844416902e155),
(47, 1.3118930086067658e25, -9.347434650324013e-157),
(48, -3.099216575121671e23, 0.17191740799896224),
(49, 513.27734375, 6.169315103399442e138),
(50, 1.6981207957288199e31, 1.553235595276201e-266),
(51, -1.1796304631116595e17, 2.059609972927675e-184),
(52, -986501056.0, -3.1945070427158674e-282),
(53, 58292476.0, -1.06972082130298e141),
(54, -1.4203994960976022e-18, 8.749596682028774e288),
(55, -7.828941306797788e-6, 1.5344428407500372e-54),
(56, -1.0219106066133419e-31, 3.874525697186665e-104),
(57, -0.00022248682216741145, -2.0199254934565108e-291),
(58, 3.966689173309779e-15, -3.9935644990683073e-134),
(59, 7.429580667168139e25, 2.896614989721052e185),
(60, -2.0374230838154363e18, 1.403122282667301e243),
(61, 1.2594012847190817e36, -6.4432442789482024e-27),
(62, -3.597980348451771e21, 1.27588639295836e-29),
(63, 9.675402378062053e-20, 5.729772407943651e-204),
(64, -2.6915499302243056e32, 1.3923459825706752e-286),
(65, 1.1558364427076795e-36, -1.6745067879870783e130),
(66, 1.9405875963038245e-25, 3.512491676602063e136),
(67, -2678.02294921875, 1.845593182341988e168),
(68, 83333.359375, -2.1158726438057665e-113),
(69, 1.1352855317412242e-27, -1.1752556245355497e180),
(70, -1.3565529244930025e-31, 7.10625218667836e169),
(71, -6.568974099110029e-35, 9.128038292326728e78),
(72, 749965632.0, 26.100409017090264),
(73, -3.192422940408775e-34, -1.8827271106731403e-283),
(74, -1.6730553001546006e-18, 8.646951925107533e-237),
(75, -131585040384.0, -2.900246076083441e201),
(76, 8.313116688543911e-20, -3.583701803049338e110),
(77, 3.0312861599103097e27, -1.033105464477069e-228),
(78, -2.8692661580009826e-9, -3.1608025039353693e-114),
(79, 1.6661872450640658e-6, -5.246588704751609e-101),
(80, 3.429970765775033e-24, -3.853122356887104e-66),
(81, -8.590454569912254e-9, -1603157.5510638105),
(82, 1.2052242153515585e-22, 1.762190988544563e259),
(83, -2.4019966571309226e-10, 3.442827619789515e305),
(84, -7.90335033212135e26, 3.688915544853158e-9),
(85, 1.1506715519726964e20, 1.856185825363751e183),
(86, -1.582902679030045e19, 4.567456213728061e282),
(87, 1.706448342340631e25, 2.994565385602456e93),
(88, 16.967838287353516, 3.441059180697452e299),
(89, -1.7456716591147254e18, 1.6129647092582622e-91),
(90, -1.2552967573911634e18, 1.4062936734520358e200),
(91, -7.6454928587424115e-34, -7.442819471086665e-292),
(92, -5.590406067755571e-13, 5.062064109209187e-302),
(93, 3.327976025148621e17, 1.0298670777918947e99),
(94, -41.087646484375, -2.4032856755403114e-280),
(95, -3.036375000994206e21, -1.1995223344396541e-207),
(96, -2.194237901724742e24, -1.3484774165468417e299),
(97, 0.9569990634918213, 2.521787143855416e-197),
(98, 1.374498209931269e-18, -3.0250956456896433e279),
(99, -1.031601547534211e31, -2.0761968006586557e-255),
(100, 1.9719611301790482e19, 5.050829248467284e266);
