# SequenceReset where NewSeqNo is greater than the expected inbound MsgSeqNum

iCONNECT
I8=FIX.4.0|35=A|34=1|49=TW|52=<TIME>|56=ISLD|98=0|108=30|
E8=FIX.4.0|9=57|35=A|34=1|49=ISLD|52=00000000-00:00:00|56=TW|98=0|108=30|10=0|

# sequence reset without gap fill flag (default to N)
I8=FIX.4.0|35=4|34=0|49=TW|52=<TIME>|56=ISLD|36=25|
I8=FIX.4.0|35=1|34=25|49=TW|52=<TIME>|56=ISLD|112=HELLO|
E8=FIX.4.0|9=55|35=0|34=2|49=ISLD|52=00000000-00:00:00|56=TW|112=HELLO|10=0|

# sequence reset with gap fill flag set to N
I8=FIX.4.0|35=4|34=0|49=TW|52=<TIME>|56=ISLD|36=50|123=N|
I8=FIX.4.0|35=1|34=50|49=TW|52=<TIME>|56=ISLD|112=HELLO|
E8=FIX.4.0|9=55|35=0|34=3|49=ISLD|52=00000000-00:00:00|56=TW|112=HELLO|10=0|

# logout message and response
I8=FIX.4.0|35=5|34=51|49=TW|52=<TIME>|56=ISLD|
E8=FIX.4.0|9=45|35=5|34=4|49=ISLD|52=00000000-00:00:00|56=TW|10=0|
eDISCONNECT
