# If two logons with the same SenderCompID/TargetCompID combination logon
# the second one must be disconnected

# First logon, succesful
i1,CONNECT
I1,8=FIX.4.4|35=A|34=1|49=TW|52=<TIME>|56=ISLD|98=0|108=30|
E1,8=FIX.4.4|9=61|35=A|34=1|49=ISLD|52=00000000-00:00:00.000|56=TW|98=0|108=30|10=0|

# Second logon, unsuccesful
i2,CONNECT
I2,8=FIX.4.4|35=A|34=1|49=TW|52=<TIME>|56=ISLD|98=0|108=30|

# wait for disconnect for second connection
e2,DISCONNECT
# force disconnect on first connection
i1,DISCONNECT
