# SendingTime is too small, reject

iCONNECT
I8=FIXT.1.1|35=A|34=1|49=TW|52=<TIME>|56=ISLD|98=0|108=30|1137=9|
E8=FIXT.1.1|9=68|35=A|34=1|49=ISLD|52=00000000-00:00:00.000|56=TW|98=0|108=30|1137=9|10=0|

# send heartbeat more than 2 minutes early
I8=FIXT.1.1|35=0|34=2|49=TW|52=<TIME-121>|56=ISLD|

# reject and logoff
E8=FIXT.1.1|9=99|35=3|34=2|49=ISLD|52=00000000-00:00:00.000|56=TW|45=2|58=SendingTime accuracy problem|372=0|373=10|10=0|
E8=FIXT.1.1|9=49|35=5|34=3|49=ISLD|52=00000000-00:00:00.000|56=TW|10=0|
I8=FIXT.1.1|35=5|34=3|49=TW|52=<TIME>|56=ISLD|
eDISCONNECT

# SendingTime is too large, reject

iCONNECT
I8=FIXT.1.1|35=A|34=1|49=TW|52=<TIME>|56=ISLD|98=0|108=30|1137=9|
E8=FIXT.1.1|9=68|35=A|34=1|49=ISLD|52=00000000-00:00:00.000|56=TW|98=0|108=30|1137=9|10=0|

# send heartbeat more than 2 minutes late
I8=FIXT.1.1|35=0|34=2|49=TW|52=<TIME+121>|56=ISLD|

# reject and logoff
E8=FIXT.1.1|9=99|35=3|34=2|49=ISLD|52=00000000-00:00:00.000|56=TW|45=2|58=SendingTime accuracy problem|372=0|373=10|10=0|
E8=FIXT.1.1|9=49|35=5|34=3|49=ISLD|52=00000000-00:00:00.000|56=TW|10=0|
I8=FIXT.1.1|35=5|34=3|49=TW|52=<TIME>|56=ISLD|
eDISCONNECT
