import CodeBlock from '@theme/CodeBlock';
import LoadBalancerHealthChecks from '../../../_admonitions/_load_balancer_health_checks.md';
import ClientBuilder from '../../../_partials/examples/01_get_info/_client_builder.md';
import java_examples
    from '!!raw-loader!../../../../../bindings/java/examples/java-app/src/main/java/org/iota/client/example/ExampleApp.java';
const javaFunctionName = 'public static void nodeInfo() {', indexStart = java_examples.indexOf(javaFunctionName);
const nextJavaFunctionName = 'public static void generateSeed() {', indexEnd = java_examples.indexOf(nextJavaFunctionName);
const get_info = java_examples.substring(indexStart, indexEnd);

<CodeBlock className="language-java">
    {get_info}
</CodeBlock>

**Output example** of the [`getInfo()`](./../libraries/java/api_reference#getinfo-nodeinfowrapper) function of the
    [`Client`](./../libraries/java/api_reference#client) instance:

<GetInfoOutput/>

<LoadBalancerHealthChecks/>

<ClientBuilder />

The most common ones are:

* `.withNetwork(string)`: Can be either `devnet` or `mainnet`. It instructs
the library whether to automatically select devnet nodes or mainnet nodes.
* `.withNode(string)`: Specify address of actual running IOTA node that should be used
to communicate with in the format `https://node:port`). For example: `https://api.lb-0.h.chrysalis-devnet.iota.cafe:443`.
* `.withNodePoolUrls(String[])`: The library also supports managing a pool of
nodes. You can provide a list of nodes and the library manages the access to them automatically by selecting them based
on their sync status. If you provide `.withNodePoolUrls(String[])`, then the library periodically will periodically
check
whether node is in sync or
not by calling `.withNodeSyncInterval(float)`.
* `.withLocalPow(boolean)`: If `.localPow (True)` a Proof-of-work will be done
locally and not remotely.
* `.withNodeSyncDisabled()`: When called, the library will use nodes that
are **not** in sync with network. This parameter is usually useful if you would like to interact with a local test node
that is not fully synced. **This parameter should not be used in production**.
