Generate a new file. It will be saved by default unless you provide --dry-run. The command will fail if the target file already exists

Usage: prdoc generate [OPTIONS] <NUMBER>

Arguments:
  <NUMBER>  Change number

Options:
      --dry-run                        Do not save the generated document to file with the proper naming, show the content instead
  -c, --config <CONFIG>                [env: PRDOC_CONFIG=.prdoc-sdk.toml]
  -o, --output-dir <OUTPUT_DIR>        Optional output directory. It not passed, the default `PRDOC_DIR` will be used under the root of the current project
  -d, --prdoc-folders <PRDOC_FOLDERS>  [env: PRDOC_FOLDERS=]
  -j, --json                           Output as json
  -h, --help                           Print help
