/* asminit.def --

   This file is part of the UCL data compression library.

   Copyright (C) 1996-2004 Markus Franz Xaver Johannes Oberhumer
   All Rights Reserved.

   The UCL library is free software; you can redistribute it and/or
   modify it under the terms of the GNU General Public License as
   published by the Free Software Foundation; either version 2 of
   the License, or (at your option) any later version.

   The UCL library is distributed in the hope that it will be useful,
   but WITHOUT ANY WARRANTY; without even the implied warranty of
   MERCHANTABILITY or FITNESS FOR A PARTICULAR PURPOSE.  See the
   GNU General Public License for more details.

   You should have received a copy of the GNU General Public License
   along with the UCL library; see the file COPYING.
   If not, write to the Free Software Foundation, Inc.,
   59 Temple Place - Suite 330, Boston, MA 02111-1307, USA.

   Markus F.X.J. Oberhumer
   <markus@oberhumer.com>
   http://www.oberhumer.com/opensource/ucl/
*/

#ifndef F
#  define F(name)       name
#endif
#ifndef global
#  define global(x)     .globl x
#endif
#ifndef typef
#  ifdef __ELF__
#    define typef(x)    .type x,@function
#  else
#    define typef(x)
#  endif
#endif
#ifndef size
#  ifdef __ELF__
#    define size(x,s)   .size x,s
#  else
#    define size(x,s)
#  endif
#endif
#ifndef db
#  define db            .byte
#endif

.text
